Aan de slag gaan

Toegang tot de 3dfx Tools Configuratietoepassing is mogelijk vanaf het Windows Configuratiescherm.

1	Klik op de Windows Start knop, wijs naar Instellingen, en klik dan op Configuratiescherm.

2	Dubbelklik op het 3dfx Tools pictogram.


Help

Online help is beschikbaar en toegankelijk door op de F1 toets te drukken in de 3dfx Tools configuratiepagina. Algemene helpinformatie over het configureren van 3dfx Tools wordt weergegeven.

 De volledige helpinhoud is toegankelijk in de online help of door op de Help knop in de 3dfx Tools Configuratietoepassing te klikken. Inlichtingen voor elke vraag over 3dfx Tools zijn beschikbaar.


Voor een Specifiek Hulpprogramma

Online help is beschikbaar voor ieder individueel hulpprogramma en is toegankelijk door het drukken op de F1 toets in één van de hulpprogramma-configuratiepagina’s. Inlichtingen over de actuele pagina worden afgebeeld.


3dfx Tools Verwijderen

Om 3dfx Tools van uw systeem te verwijderen:

1	Sluit ieder programma.

2	Klik op de Windows Start knop, wijs naar Instellingen, en klik dan op Configuratiescherm.

3	Dubbelklik op het pictogram Programma's installeren/verwijderen.

4	Volg de aanwijzingen op het scherm.

5	U moet het systeem opnieuw starten om het verwijderen van 3dfx Tools te voltooien.


3dfx Tools Configuratiepagina

Dit is de configuratiepagina voor 3dfx Tools.

De configuratiepagina bevat een lijst met alle actueel geïnstalleerde hulprogramma’s en maakt het de gebruiker mogelijk om deze hulpprogramma’s, indien noodzakelijk, in te schakelen of uit te schakelen.

Als meer dan een grafische versneller geïnstalleerd zijn, kunnen de hulpprogramma's voor ieder specifieke kaart in- of uitgeschakeld worden.


Een hulpprogramma inschakelen of uitschakelen

Om een hulpprogramma in of uit te schakelen:

1	Selecteer de grafische versneller waarvoor het hulpprogramma in- of uitgeschakeld moet worden.

2	Selecteer of de-selecteer het selectievakje van het hulpprogramma.

3	Klik op de knop Toepassen of Ok om de wijzigingen toe te passen.

Om de wijzigingen ongedaan ter maken, klik op Annuleren.

De configuratiepagina’s voor uitgeschakelde hulpprogramma’s worden niet in de 3dfx Tools Configuratietoepassing of in de Geavanceerde instellingen pagina weergegeven.


3dfx Tools Info

Het 3dfx Tools Info Vakje is toegankelijk door met de linker muisknop op titelbalk van het 3dfx Tools Configuratiehulpprogramma te klikken en daarna 3dfx Tools Info te selecteren.

Het Info Vakje bevat informatie over de Versie.